-- phpMyAdmin SQL Dump
-- version 3.5.7
-- http://www.phpmyadmin.net
--
-- Client: localhost
-- Généré le: Mar 14 Avril 2015 à 08:47
-- Version du serveur: 5.1.73
-- Version de PHP: 5.3.3

SET SQL_MODE="NO_AUTO_VALUE_ON_ZERO";
SET time_zone = "+00:00";


/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8 */;

--
-- Base de données: `hcer`
--

-- --------------------------------------------------------

--
-- Structure de la table `hcerdocs`
--

CREATE TABLE IF NOT EXISTS `hcerdocs` (
  `documentbody` text NOT NULL,
  `creationDate` datetime DEFAULT NULL,
  `creator` varchar(255) DEFAULT NULL,
  `patient` varchar(255) DEFAULT NULL,
  `fromcountry` varchar(20) DEFAULT NULL,
  `docid` bigint(20) NOT NULL AUTO_INCREMENT,
  PRIMARY KEY (`docid`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 AUTO_INCREMENT=1 ;

/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
